
              Standard Install: Local Host Information

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-

Standard Install will install all EnlightenDSM components onto your local
machine. EnlightenDSM consists of three major components: a Global 
Managment Server (GMS) which includes both a Progammable Events Processor 
(PEP) and an Enterprise Management Database (EMD), Distributed System 
Agents (DSA), and a Graphical User Interphase (GUI). 

The GMS requires approximately 17M free disk space.
The DSA and GUI require approximately 40M free disk space.

The root password is required for installation.

Continue Button:

Press 'Continue' after you have specified the installation directories
and the root password. At this time the EnlightenDSM installer will 
verify that the root password is correct, the specified installation 
directories contains sufficient free disk space, and the local machine's
operating system is supported.

If any errors are encountered, you will have a chance to re-specify
your installation parameters before continuing. If no errors are 
encountered, the Setup Remote Host(s) window will appear.

No components are installed at this time.

Cancel Button:

Press 'Cancel' to exit the EnlightenDSM Installer. 
No components will be installed.

Root Password:

Enter the local machines root password in this text field.

GMS Directory:

Enter the directory into which the GMS should be installed. This must be
a local partition.

GUI/DSA Directory:

Enter the directory into which the GUI and DSA should be installed.

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-

(c) 1996 - 1999 Enlighten Software Solutions, Inc.
